The Architecture of XTAG Parser

1

The Syntactic Database

Extracted from:

ffl Oxford Dictionary for

Contemporary Idiomatic English ffl Oxford Advanced Learner’s Dictionary

Entries: 31,000 entries.

The SynDB tool: xsyn

The Morphological Database

Extracted from:

ffl Collins English Dictionary ffl Oxford Advanced Learner’s Dictionary

Entries: about 317,000 inflected items (with their root forms and inflectional information)

The MorphDB tool: xmdbm